0.0 0.5 1.0 1.5 2.0 2.5 0 5 10 15 20 25 30

2.4 2.6 2.8 3.0 3.2 3.4 3.6 3.8 4.0 4.2 0.0 1.0 2.0 3.0 4.0 10K D1 D2 D3 D4

Voltage (V)

Current density (kA/cm^2)

(a)

Intensity (a.u.)

10K D4

D3

D2

(b)

Frequency (THz)

1.3 kA/cm^2

1.6 kA/cm^2

1.9 kA/cm^2

2.3 kA/cm^2

D1

0.2 0.4 0.6 0.8 80 100 120 140

D4 D3 D2

T_{max} (K)

Oscillator strength (a.u.)

D1