0 5 10 15 20 25 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 D2, 10K

Electric field (kV/cm)

J_{i’-i} (kA/cm^2)

i’-1 i’-2 i’-3 (a)

0 5 10 15 20 25 0.0 0.2 0.4 0.6 0.8 1.0

Electric field (kV/cm)

D2, 10K (b) 1-i" 2-i" 3-i"

J_{i-i"} (kA/cm^2)